%! TEX root = ../thesis.tex

\chapter{Intro}

\section{Premise}

\section{Hardware Overview}

The hardware used in this thesis is a PowerIt board, developed in the electronic visions group\footnote{
    %TODO    
}. It functions as power supply inside of the Waferscale System\footnote{
    %TODO
} (fig. \ref{wss}). 
\begin{figure}[h]
    \centering
    \includegraphics[width=.9\textwidth]{../InternReport/img/waferscale_system.png}
    \caption{WSS}
    \label{wss}
\end{figure}
In which it is providing the Wafer with 1.8V and the FPGAs with 9.6V. Its maximum rated Pwerdraw is 2kW. 

<containing intro to system and board>

\section{Measurement Hardware}

<contains circuits to all measureing adcs, and description of the measureing process>
