\documentclass[notitlepage, a4]{scrreprt}
\input{preamble}
\usepackage{xparse}
\usepackage{siunitx}
\sisetup{separate-uncertainty}
\input{../pitstop/20180819/res.tex}

\usepackage{fontawesome}
\pretitle{\centering \huge \bfseries }
\posttitle{\par\vspace{0.5em}}
\preauthor{\begin{center}\Large}
\postauthor{\end{center}}
\predate{\par\large\centering}
\postdate{\par\vspace{3cm}}

\titleformat{\chapter}{\bfseries\huge\color{myteal}}{\thechapter}{.5em}{}
\titleformat*{\section}{\bfseries\Large\color{myteal}}
\titleformat*{\subsection}{\bfseries\large\color{myteal}}

\author{Patrick Nisblé}
\title{\color{myteal}Calibration and Regulation of BrainScaleS' PowerIt Subsystems}
\begin{document}
    \maketitle
    \thispagestyle{empty}

    \begin{abstract}
        This Thesis will address Calibration and Regulation of the in BrainScaleS used power delivery Board, PowerIt.
        Its circuitry will be examined and calibrated, for use in BrainScaleS' monitoring and a method of regulating the 1.8V Output Terminal will be implemented.

        This thesis also contains the changes done to the PowerIt Firmware while working on these Problems.
        \\\\

        Diese Arbeit befasst sich mit de Kalibration und Regulation der PowerIt Komponenete des BrainScale Systems. Die Schaltungen werden untersucht und kalibriert, damit sie in der Systemüberwachung von nutzen sein können.

        Ausserdem enthält diese Arbeit die Änderungen, die dabei auf die PowerIt Firmware angewendet werden.
    \end{abstract}

    \setcounter{tocdepth}{1}
    \tableofcontents
    \include{parts/intro}
    \include{parts/theory} 
    \include{parts/experiments}
    \include{parts/results}
    \include{parts/outlook}

    \bibliographystyle{ieeetr}
    \bibliography{../../github/ubib/ubib.bib}
\end{document}
