%! TEX root = ../thesis.tex
\chapter{Experiments}
<contains the experimental observations defined in th theory>

\section{Characterization}

\subsection{Voltages}

    \subsubsection{48V Input}

        \begin{figure}
            \centering
            \hspace*{-.16\columnwidth}
            \includegraphics[width=1.3\columnwidth]{./data/m04_cycledepends/cycledepends_20180529.pdf}
            \caption{plotted difference from set input voltage, and fitted linearly, May 29th 2018, $\approx$32\si\degree C}
        \end{figure}
        \begin{figure}
            \centering
            \hspace*{-.16\columnwidth}
            \includegraphics[width=1.3\columnwidth]{./data/m04_cycledepends/cycledepends_20180530.pdf}
            \caption{plotted difference from set input voltage, and fitted linearly, May 30th 2018, $\approx$25\si\degree C}
        \end{figure}

    \subsubsection{9.6V Output}

    \subsubsection{1.8V Output}

        \begin{figure}[h]
            \centering
            \hspace*{-.16\columnwidth}
            \includegraphics[width=1.3\columnwidth]{./data/m02_adccalib_48/adccalib_v18ana.pdf}
            \caption{}
            \label{1v8anabefore}
        \end{figure}
        \begin{figure}[h]
            \centering
            \hspace*{-.16\columnwidth}
            \includegraphics[width=1.3\columnwidth]{./data/m02_adccalib_48/adccalib_v18digi.pdf}
            \caption{}
            \label{1v8digibefore}
        \end{figure}


\subsection{Currents}

    \subsubsection{48V Input}

    \subsubsection{9.6V Output}

    \subsubsection{1.8V Output}


\section{after Calibration}

\subsection{Voltages}

    \subsubsection{48V Input}

    \subsubsection{9.6V Output}

    \subsubsection{1.8V Output}

\subsection{Currents}

    \subsubsection{48V Input}

    \subsubsection{9.6V Output}

    \subsubsection{1.8V Output}

\section{1.8V Regulation}

\subsection{Characterization of Dropoff}

\subsection{after <METHOD>-Correction}
