%! TEX root = ../thesis.tex


\chapter{Introduction}

\section{What is the BrainScale System?}

The BrainScaleS Wafer System, developed and used in the electronic visions Group at Heidelberg University is a neuromorhic hardware implementation.

For this Thesis important core components, inside the System, are the mixed-signal ASICs, named HICANNs (on Wafer in fig. \ref{wss}), and FPGAs for controlling these HICANNs \cite{hbpguidebook-brainscales}


\section{What's the PowerIt Subsystem?}

The hardware used in this thesis is a PowerIt board, developed in the electronic visions group\footnote{
    %TODO    
}. It functions as power supply inside of the Waferscale System\footnote{
    %TODO
} (fig. \ref{wss}). 
\begin{figure}[h]
    \centering
    \includegraphics[width=.9\textwidth]{../InternReport/img/waferscale_system.png}
    \caption{WSS}
    \label{wss}
\end{figure}
In which it is providing the Wafer with 1.8V and the FPGAs with 9.6V. Its maximum rated Pwerdraw is 2kW. 

<containing intro to system and board>

%TODO: mv to theory <contains circuits to all measureing adcs, and description of the measureing process>

\section{Goals}
<containing the Goals defined beforehand>

\subsection{Firmware}

\subsection{Calibration}

\subsection{Regulation}
