%! TEX root = ../thesis.tex
\chapter{Results}

\section{Firmware}

\subsection{I2C mapped Register-Table}
\input{./tabs/registerbuffer}

\section{Calibration}

\subsection{Calibration-Table}

\subsection{How to calibrate a PowerIt Board}

\section{Regulation}
