%! TEX root = ../thesis.tex

\chapter{Intro}

\section{The Hardware}

The hardware used in this thesis is a PowerIt board, developed in the electronic visions group. It functions as power supply inside of the Waferscale System\footnote{
    %TODO
}. In which it iis providing the HICANN Chips with ~1.8V and the FPGAs with 9.6V.
<containing intro to system and board>
